France
Glider
553
571
101
2428.88
0
0
16
0
10.07
20000
1
5.43468
8.4707
0.125
-0.14
-25
56
0
0.5
2.5
3
537.139
554.807
449.636
557.483
405.794
494.422
1
Glider
1
-474.034
1903.87
99.8426
-2.60844
-0.148771
0.0257586
19.9042
1
0
0
0
